% Intended LaTeX compiler: pdflatex
\documentclass[conference]{IEEEtran}
 \usepackage{hyperref}
\IEEEoverridecommandlockouts
\author{\IEEEauthorblockN{1\textsuperscript{st} Anne-Cécile Orgerie}
\IEEEauthorblockA{\textit{Univ Rennes, Inria, CNRS, IRISA, Rennes, France} \\
Rennes, France \\
anne-cecile.orgerie@irisa.fr}
\and
\IEEEauthorblockN{2\textsuperscript{nd} Loic Guegan}
\IEEEauthorblockA{\textit{Univ Rennes, Inria, CNRS, IRISA, Rennes, France} \\
Rennes, France \\
loic.guegan@irisa.fr}
}
\date{\today}
\title{A Large-Scale Wired Network Energy Model for Flow-Level Simulations}
\hypersetup{
 pdfauthor={},
 pdftitle={A Large-Scale Wired Network Energy Model for Flow-Level Simulations},
 pdfkeywords={},
 pdfsubject={},
 pdfcreator={Emacs 26.2 (Org mode 9.1.9)}, 
 pdflang={English}}
\begin{document}

\maketitle
\begin{abstract}
This document is a model and instructions for \LaTeX.
This and the IEEEtran.cls file define the components of your paper [title, text, heads, etc.]. *CRITICAL: Do Not Use Symbols, Special Characters, Footnotes, 
or Math in Paper Title or Abstract.
\end{abstract}

\begin{IEEEkeywords}
component, formatting, style, styling, insert
\end{IEEEkeywords}


\section{Introduction}
\label{sec:org9428352}
\section{Related Work}
\label{sec:orga22ca2a}
\section{Use-Case}
\label{sec:org3241664}
\subsection{Application Characteristic}
\label{sec:org8ebb00c}
\subsection{Cloud Infrastructure}
\label{sec:org17d08e8}
\section{System Model}
\label{sec:org2051e46}
\subsection{IoT Part}
\label{sec:org9fc7024}
The IoT part is composed of an Access Point (AP), connected to several sensors using WIFI. In the
system, the IoT part is considered as the part where the system data are created. In fact, the
data life cycle start when the sensors records their respectives local temperature at a frequency
\(f\) and the local timestamp. Then, these data are transmitted through the network along with an
arbitrary sensor id of 128 bits. Finally, the AP is in charge to transmit the data to the cloud
using the network part.

\subsection{Network Part}
\label{sec:orgb1e4614}
The network part is considered as the medium that link the IoT part to the cloud. It is composed
of several network switches and router and it is mostly considered as wired network.


\subsection{Cloud Part}
\label{sec:org4dad506}
\section{Evaluation}
\label{sec:org373c2b1}
\subsection{IoT/Network Consumption}
\label{sec:org993439d}
\subsection{Cloud Energy Consumption}
\label{sec:org7ae8276}
\subsection{Virtual Machine Size Impact}
\label{sec:orgde03152}
\subsection{Application Accuracy}
\label{sec:org79ddac3}
Refresh frequency etc\ldots{}
\subsection{End-To-End Consumption}
\label{sec:org275997a}
\section{Discussion}
\label{sec:org25eaadf}
\section{Conclusion}
\label{sec:orgff11457}
\end{document}
