% Generated by IEEEtran.bst, version: 1.14 (2015/08/26)
\begin{thebibliography}{1}
\providecommand{\url}[1]{#1}
\csname url@samestyle\endcsname
\providecommand{\newblock}{\relax}
\providecommand{\bibinfo}[2]{#2}
\providecommand{\BIBentrySTDinterwordspacing}{\spaceskip=0pt\relax}
\providecommand{\BIBentryALTinterwordstretchfactor}{4}
\providecommand{\BIBentryALTinterwordspacing}{\spaceskip=\fontdimen2\font plus
\BIBentryALTinterwordstretchfactor\fontdimen3\font minus
  \fontdimen4\font\relax}
\providecommand{\BIBforeignlanguage}[2]{{%
\expandafter\ifx\csname l@#1\endcsname\relax
\typeout{** WARNING: IEEEtran.bst: No hyphenation pattern has been}%
\typeout{** loaded for the language `#1'. Using the pattern for}%
\typeout{** the default language instead.}%
\else
\language=\csname l@#1\endcsname
\fi
#2}}
\providecommand{\BIBdecl}{\relax}
\BIBdecl

\bibitem{orgerie_ecofen:_2011}
A.~C. Orgerie, L.~Lefèvre, I.~Guérin-Lassous, and D.~M.~L. Pacheco,
  ``{ECOFEN}: {An} {End}-to-end energy {Cost} {mOdel} and simulator {For}
  {Evaluating} power consumption in large-scale {Networks},'' in \emph{2011
  {IEEE} {International} {Symposium} on a {World} of {Wireless}, {Mobile} and
  {Multimedia} {Networks}}, Jun. 2011, pp. 1--6.

\end{thebibliography}
