From 026a84902cdc22f64b53aea3678d576bc29f479b Mon Sep 17 00:00:00 2001
From: Loic Guegan <manzerberdes@gmx.com>
Date: Thu, 16 May 2019 14:32:18 +0200
Subject: Update simulators

---
 ns3-simulations/plots/plots.tex | 13 +++++++++----
 1 file changed, 9 insertions(+), 4 deletions(-)

(limited to 'ns3-simulations/plots/plots.tex')

diff --git a/ns3-simulations/plots/plots.tex b/ns3-simulations/plots/plots.tex
index ea553c6..074d33c 100644
--- a/ns3-simulations/plots/plots.tex
+++ b/ns3-simulations/plots/plots.tex
@@ -1,4 +1,4 @@
-% Created 2019-05-06 lun. 12:03
+% Created 2019-05-15 mer. 15:24
 % Intended LaTeX compiler: pdflatex
 \documentclass[11pt]{article}
 \usepackage[utf8]{inputenc}
@@ -40,8 +40,13 @@ linksLatency & 2ms\\
 \end{tabular}
 \newline
 \end{center}
-\includegraphics[width=0.5\linewidth]{BW-linksBandwidth_totalEnergy.png}
+\includegraphics[width=0.5\linewidth]{SENDINTERVAL-sensorsSendInterval_networkEnergy.png}
+\includegraphics[width=0.5\linewidth]{SENDINTERVAL-sensorsSendInterval_sensorsEnergy.png}
+\includegraphics[width=0.5\linewidth]{SENSORSPOS-positionSeed_avgDelay.png}
 \includegraphics[width=0.5\linewidth]{NBSENSORS-sensorsNumber_totalEnergy.png}
-\includegraphics[width=0.5\linewidth]{LATENCY-linksLatency_totalEnergy.png}
-\includegraphics[width=0.5\linewidth]{NBHOP-nbHop_totalEnergy.png}
+\includegraphics[width=0.5\linewidth]{SENDINTERVAL-sensorsSendInterval_totalEnergy.png}
+\includegraphics[width=0.5\linewidth]{SENDINTERVAL-sensorsSendInterval_energyWifi.png}
+\includegraphics[width=0.5\linewidth]{sensorsSendInterval-net.png}
+\includegraphics[width=0.5\linewidth]{SENSORSPOS-positionSeed_totalEnergy.png}
+\includegraphics[width=0.5\linewidth]{sensorsSendInterval-wifi.png}
 \end{document}
-- 
cgit v1.2.3

