From fd455e9f8d492ecb441a297720b0bf9d03b897cb Mon Sep 17 00:00:00 2001
From: ORGERIE Anne-Cecile <anne-cecile.orgerie@inria.fr>
Date: Fri, 19 Jul 2019 10:21:32 +0200
Subject: continuation des formules

---
 2019-ICA3PP.bbl | 9 +++++++++
 1 file changed, 9 insertions(+)

(limited to '2019-ICA3PP.bbl')

diff --git a/2019-ICA3PP.bbl b/2019-ICA3PP.bbl
index 17121e5..6b99781 100644
--- a/2019-ICA3PP.bbl
+++ b/2019-ICA3PP.bbl
@@ -169,4 +169,13 @@ A.~Shehabi, S.~Smith, D.~Sartor, R.~Brown, M.~Herrlin, J.~Koomey, E.~Masanet,
   \url{http://www.osti.gov/servlets/purl/1372902/}
 \BIBentrySTDinterwordspacing
 
+\bibitem{Hassidim2013}
+A.~{Hassidim}, D.~{Raz}, M.~{Segalov}, and A.~{Shaqed}, ``{Network utilization:
+  The flow view},'' in \emph{IEEE INFOCOM}, 2013, pp. 1429--1437.
+
+\bibitem{Zhang2016}
+Z.~{Zhang}, Y.~{Bejerano}, and S.~{Antonakopoulos}, ``{Energy-Efficient IP Core
+  Network Configuration Under General Traffic Demands},'' \emph{IEEE/ACM
+  Transactions on Networking}, vol.~24, no.~2, pp. 745--758, 2016.
+
 \end{thebibliography}
-- 
cgit v1.2.3

