From 0d5c89c5951b7b6dd0106eafdf3fd51705377aa6 Mon Sep 17 00:00:00 2001
From: Loic Guegan <loic.guegan@mailbox.org>
Date: Wed, 23 Aug 2023 10:32:34 +0200
Subject: Debug return code and improving documentation

---
 manual/manual.tex | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'manual/manual.tex')

diff --git a/manual/manual.tex b/manual/manual.tex
index e5e6db8..3cc68f5 100644
--- a/manual/manual.tex
+++ b/manual/manual.tex
@@ -180,6 +180,9 @@ breakpoints_callback:
   \label{keywords:general}
 \end{table}
 
+\subsubsection{Notes}
+The \textbf{interferences} keywords allows to control interference detection. It works as follow. If at any point in time during a wireless communication, another communication happens, on the same wireless interface, in the range of the receiver, then the interference return code will be given to the receiver upon reception.
+
 \subsection{The node section}
 The node section is used configure the simulated node of esds. Table \ref{keywords:nodes} references
 all the keywords used in the nodes section.
-- 
cgit v1.2.3

